20	3
1	DataSet	Variable1	1	2	0	99999	
2	DepY	Variable2	1	2	0	99999	
3	IndX1	Variable3	0	8	2	99999	
UNITS	DataSet	DepY	IndX1	
41	3	0	1.00	
42	3	0	2.00	
43	3	0	3.00	
44	3	0	4.00	
45	3	0	5.00	
46	3	0	6.00	
47	3	0	7.00	
48	3	0	8.00	
49	3	0	9.00	
50	3	0	10.00	
51	3	1	1.00	
52	3	1	2.00	
53	3	1	3.00	
54	3	1	4.00	
55	3	1	5.00	
56	3	1	6.00	
57	3	1	7.00	
58	3	1	8.00	
59	3	1	9.00	
60	3	1	10.00	
