20	2
1	values	values	0	8	3	99999	
2	group	Variable2	2	8	3	99999	
UNITS	values	group	
CASE_1	0.398	f	
CASE_2	-1.197	f	
CASE_3	-0.486	f	
CASE_4	-1.908	m	
CASE_5	-0.841	f	
CASE_6	-0.301	f	
CASE_7	0.696	m	
CASE_8	1.116	m	
CASE_9	0.479	m	
CASE_10	1.099	f	
CASE_11	-0.944	f	
CASE_12	-0.218	m	
CASE_13	0.810	f	
CASE_14	-0.062	m	
CASE_15	0.672	f	
CASE_16	-0.019	f	
CASE_17	0.001	m	
CASE_18	0.016	m	
CASE_19	1.199	f	
CASE_20	0.980	f	
