40	2
1	LotNo	LotNo	0	8	3	99999	
2	BoltLngth	BoltLngth	0	8	3	99999	
0	LotNo	BoltLngth	
1	1.00	19.50	
2	1.00	19.80	
3	1.00	19.60	
4	1.00	20.40	
5	1.00	20.10	
6	2.00	20.10	
7	2.00	19.80	
8	2.00	20.30	
9	2.00	19.70	
10	2.00	19.60	
11	3.00	20.00	
12	3.00	20.40	
13	3.00	20.50	
14	3.00	19.90	
15	3.00	20.00	
16	4.00	19.90	
17	4.00	20.40	
18	4.00	20.30	
19	4.00	20.10	
20	4.00	19.70	
21	5.00	19.80	
22	5.00	19.20	
23	5.00	19.70	
24	5.00	20.40	
25	5.00	20.30	
26	6.00	20.30	
27	6.00	20.00	
28	6.00	19.40	
29	6.00	20.20	
30	6.00	19.60	
31	7.00	19.60	
32	7.00	20.70	
33	7.00	20.30	
34	7.00	19.80	
35	7.00	19.70	
36	8.00	20.40	
37	8.00	19.40	
38	8.00	19.80	
39	8.00	20.40	
40	8.00	19.90	
