15	1
1	VAR1	VAR1	0	8	2	99999	
0	VAR1	
1	0.10	
2	0.40	
3	0.60	
4	0.80	
5	1.10	
6	1.20	
7	1.30	
8	1.50	
9	1.70	
10	1.90	
11	1.90	
12	2.00	
13	2.20	
14	2.60	
15	3.20	
