5	5
1	label	Variable1	2	8	0	99999	
2	Ibuprofen_low	Variable2	1	8	0	99999	
3	Ibuprofen_Hi	Variable3	1	8	0	99999	
4	Placebo	Variable4	1	8	0	99999	
5	Aspirin	Variable5	1	8	0	99999	
UNITS	label	Ibuprofen_low	Ibuprofen_Hi	Placebo	Aspirin	
CASE_1	None	0	1	0	1	
2	Poor	6	3	18	4	
3	Fair	10	5	10	11	
4	Good	17	25	37	25	
5	Very_Good	61	52	32	47	
